<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">\subsubsection{Name}

AlimVerticalRail, AlimHorizontalRail -- Placement of a vertical/horizontal alimentation call back

\subsubsection{Synopsys}

\begin{verbatim}
AlimVerticalRail ( nb )
\end{verbatim}

\subsubsection{Description}

These functions place a vertical/horizontal alimentation call back. It's position is given by the parameter given.
    
\subsubsection{Parameters}

\begin{itemize}
    \item \verb-nb- : coordinate of the rail
    \begin{itemize}
        \item For AlimVerticalRail, \verb-nb- is in pitches i.e. 5 lambdas
        \item For AlimHorizontalRail, \verb-nb- is in slices i.e. 50 lambdas
    \end{itemize}
\end{itemize}
    
\subsubsection{Example}

\begin{verbatim}
AlimVerticalRail   (  50 )
AlimVerticalRail   ( 150 )
    
AlimHorizontalRail (  10 )
\end{verbatim}

\subsubsection{Errors}
    
Some errors may occur :
\begin{itemize}
    \item \verb-[Stratus ERROR] AlimHorizontalRail :-\\\verb-Illegal argument y, y must be between ... and ...-\\The argument given is wrong : the call back would not be in the abutment box.
    \item \verb-[Stratus ERROR] Placement of cells :-\\\verb-please check your file of layout with DRUC.-\\The placement of the cell needs to be correct in order to place a call back. Check the errors of placement.
\end{itemize} 

\begin{htmlonly}

\subsubsection{See Also}

\hyperref[ref]{\emph{Introduction}}{}{Introduction}{secintroduction}
\hyperref[ref]{\emph{Layout}}{}{Layout}{seclayout}
\hyperref[ref]{\emph{PlaceCentric}}{}{PlaceCentric}{seccentric}
\hyperref[ref]{\emph{PlaceGlu}}{}{PlaceGlu}{secglu}
\hyperref[ref]{\emph{FillCell}}{}{FillCell}{secfillcell}
\hyperref[ref]{\emph{Pads}}{}{Pads}{secpads}
\hyperref[ref]{\emph{Alimentation connectors}}{}{Alimentation connectors}{secconnectors}
\hyperref[ref]{\emph{PowerRing}}{}{PowerRing}{secpowerring}
\hyperref[ref]{\emph{RouteCk}}{}{RouteCk}{secrouteck}

\end{htmlonly}
</pre></body></html>