<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">\hypertarget{class_wire}{}\section{Wire Class Reference}
\label{class_wire}\index{Wire@{Wire}}


\subsection{Detailed Description}
This class describes wire.

A wire is used by schematic to the connections between instances. It is defined by\+:
\begin{DoxyItemize}
\item a start point (\mbox{\hyperlink{class_instance_point}{Instance\+Point}} or \mbox{\hyperlink{class_port_point}{Port\+Point}}),
\item a end point (\mbox{\hyperlink{class_instance_point}{Instance\+Point}} or \mbox{\hyperlink{class_port_point}{Port\+Point}}),
\item a list of \mbox{\hyperlink{class_intermediate_point}{Intermediate\+Point}}, this list may be empty.
\end{DoxyItemize}

\begin{DoxyNote}{Note}
Althought the \mbox{\hyperlink{class_wire}{Wire}} object is related to \mbox{\hyperlink{class_schematic}{Schematic}}, it is handled by \mbox{\hyperlink{class_net}{Net}} object since a wire is always associated to a \mbox{\hyperlink{class_net}{Net}}. 
\end{DoxyNote}
</pre></body></html>