\subsubsection{Name}

RouteCk -- Routing of signal Ck to standard cells

\subsubsection{Synopsys}

\begin{verbatim}
RouteCk ( net )
\end{verbatim}

\subsubsection{Description}

This function routes signal Ck to standard cells.
    
\subsubsection{Parameters}

\begin{itemize}
    \item \verb-net- : the net which the fonction is applied to
\end{itemize}
    
%\subsubsection{Example}
%
%\begin{verbatim}
%netCk = SignalIn ( "ck", 1 )
%RouteCk ( netCk )
%\end{verbatim}
%
\subsubsection{Errors}

Some errors may occur :
\begin{itemize}
    \item \verb-[Stratus ERROR] RouteCk : Pads in the north haven't been placed-\\The pads must be placed before calling RoutageCk.
\end{itemize}

\begin{htmlonly}

\subsubsection{See Also}

\hyperref[ref]{\emph{Introduction}}{}{Introduction}{secintroduction}
\hyperref[ref]{\emph{Layout}}{}{Layout}{seclayout}
\hyperref[ref]{\emph{PlaceCentric}}{}{PlaceCentric}{seccentric}
\hyperref[ref]{\emph{PlaceGlu}}{}{PlaceGlu}{secglu}
\hyperref[ref]{\emph{FillCell}}{}{FillCell}{secfillcell}
\hyperref[ref]{\emph{Pads}}{}{Pads}{secpads}
\hyperref[ref]{\emph{Alimentation rails}}{}{Alimentation rails}{secrails}
\hyperref[ref]{\emph{Alimentation connectors}}{}{Alimentation connectors}{secconnectors}
\hyperref[ref]{\emph{PowerRing}}{}{PowerRing}{secpowerring}

\end{htmlonly}
